**************************** FORM Executor Help ******************************

The form executor is used to fill in forms and/or to print them.   Filling  in
is  optional.   You can print to your printer or to a file if your printer  is
unavailable.  You can save the form inputs you typed to a file.  Likewise, you
can  load  the  input  fields on you form from a file.    This  is  handy  for
complicated forms with many input fields.

Functions:

    ESC - Exit Form Execute:    Terminates  form  execution.   Two consecutive
          pushes of this key are required.   If you push ESC once by accident,
          hit any other key except ESC to cancel and resume.

    F1  - Help:   Displays  on-screen  help.   Basic help information is shown
          first.    Pressing  F1  a  second time will provide  detailed  help.
          Pressing  F2   instead  will cause FORM MASTER to display  the  file
          having the same name as the form but with a '.HLP' extension.   Thus
          you can build a custom help file for your form.   Pressing any other
          key after the first F1 push will resume the form executor.

    F2  - Initialize Form:   This will restore the form back to where it  was
          when you started the form executor, ready to be filled in.  The only
          difference is the form  number will have been incremented if you had
          printed the form, and you will have a new date and time if these are
          automatically  fill  in.    Two consecutive pushes of this  key  are
          required.   If you push  F2 by accident, press any key other than F2
          to cancel.

    F7  - Load fields from an edit file:  You will be prompted on the top line
          to enter the name of a file from which to load the form input fields
          from.  Each line from this file will be used to fill in one field on
          the form.   If a field is longer than the line used to fill it,  the
          field is blank filled at the end. Fields are filled until the end of
          file is reached or when all the fields are filled.  This function is
          used to re-load entries saved earlier with F8.   If you press F7  by
          accident, just press carriage return to cancel.

    F8  - Save fields to an edit file:  You will be prompted on the  top  line
          to enter the name of a file to which all the  form input fields  are
          saved.    You will then be prompted to press F8  again to create the
          file or overwrite it, whichever applies.   Then the contents of each
          form  input field will be used (in order)  to  fill the lines of the
          edit file.   Use this option to save your  form  entries if you  may
          need to use the  same  entries again  (such  as when you configuring
          your printer with form PRINTER.FRM).   If you press F8  by accident,
          just press carriage return to cancel.

    F9  - Print to a file:   You will be prompted on the top line to enter the
          name of a file to print into.  You will then be prompted to press F9
          again to create the file or overwrite it,  whichever applies.   When
          through,   this  file  will contain the  same  characters  including
          printer configuring escape sequences which would normally have  gone
          to your printer if you had used F10.  Use this option if you printer
          is  not  currently available.   To send the contents of this file to
          your printer, enter from DOS:   COPY filename PRN.   If you press F9
          by accident, just press carriage return to cancel.

    F10 - Print to your  printer:   Prints the form  to your printer (standard
          printer device - PRN).   You will be  prompted to press F10 a second
          time to start printing.

NOTE:     The  form number in the form file is incremented  by  one  the first
          time the form is printed.  You may print multiple copies by using F9
          and/or F10  repeatedly, but the number is only incremented after the
          first print.   However,  if you exit the Form Executor or initialize
          by pressing F2, your form will now show the updated form number.

Other Form Executor Features

    Tab, Return  Go to beginning of next input field.
    BackTab      Also shift Tab.  Go to beginning of previous input
                 field.
    Home         Move cursor to line 1 and column 1.
    End          Move cursor to line and column numbers entered on the
                 main menu.
    PgUp         Move form down 24 lines.
    PgDn         Move form up 24 lines.
    Insert       Insert a blank in the input field at cursor
    Delete       Delete character in the input field at cursor

************************* End Of Form Executor Help **************************

