

                          AUTOMAXX INSTALLATION

    AUTOMAXX is a powerful fixed disk manager.  To install the software

    you must first make the hard disk directory onto which AUTOMAXX is
    to be installed the current directory, then you log onto drive A

    and type


		'INSTALLC' for installation to drive C
		 or
		'INSTALLD' for installation to drive D.

   For installation to other drives please refer to the documentation.



